7755

283

718

1768

757

1207

-log2(LPE p-value) log2(Fold Change)

0 10 20 30

-6 -4 -2 0 2 4 6

(a)

A log2(Fold Change)

0 5 10 15

-6 -4 -2 0 2 4 6

(b)